// ======================================================================
//
// DebugFlagPlatform.def
// jeff grills
//
// copyright 1998 origin systems inc
//
// ======================================================================

#ifndef DEBUG_FLAG_PLATFORM_DEF
#define DEBUG_FLAG_PLATFORM_DEF

// ======================================================================

const int DF_P_BASE                     = 0;

const int DF_P_NO_MONO_CLEAR            = DF_P_BASE + 0;
const int DF_P_NO_MOVIES                = DF_P_BASE + 1;
const int DF_P_ALLOC_LOGGING            = DF_P_BASE + 2;
const int DF_P_TREEFILE_LOG             = DF_P_BASE + 3;
const int DF_P_TREEFILE_HISTORY         = DF_P_BASE + 4;

// remember to update ConfigPlatform.cpp and DebugMenu.cpp

const int DF_P_CNT                      = DF_P_BASE + 5;

// ======================================================================

#endif
