// ======================================================================
//
// DebugKeyPlatform.def
// jeff grills
//
// copyright 1998 origin systems inc
//
// ======================================================================

#ifndef DEBUG_KEY_PLATFORM_DEF
#define DEBUG_KEY_PLATFORM_DEF

// ======================================================================

const int DK_P_BASE             = DK_B_CNT;

const int DK_P_RASTER           = DK_P_BASE + 0;

// remember to update ConfigPlatform.cpp and DebugMenu.cpp

const int DK_P_CNT              = DK_P_BASE + 1;

// ======================================================================

#endif
